[[per_request_configuration]]
=== Per-request configuration

There are several configurations that can be set on a per-request basis, rather 
than at a connection- or client-level. These are specified as part of the 
request associative array.


==== Request Identification

You can enrich your requests against {es} with an identifier string, that allows 
you to discover this identifier in 
https://www.elastic.co/guide/en/elasticsearch/reference/7.4/logging.html#deprecation-logging[deprecation logs], 
to support you with 
https://www.elastic.co/guide/en/elasticsearch/reference/7.4/index-modules-slowlog.html#_identifying_search_slow_log_origin[identifying search slow log origin]
or to help with 
https://www.elastic.co/guide/en/elasticsearch/reference/current/tasks.html#_identifying_running_tasks[identifying running tasks].


[source,php]
----
$client = ClientBuilder::create()->build();

$params = [
    'index' => 'test',
    'id'    => 1,
    'client' => [
        'opaqueId' => 'app17@dc06.eu_user1234', <1>
    ]
];
$response = $client->get($params);

----
<1> This populates the `X-Opaque-Id` header with the value 
`app17@dc06.eu_user1234`.


==== Ignoring exceptions

The library attempts to throw exceptions for common problems. These exceptions 
match the HTTP response code provided by {es}. For example, attempting to GET a 
nonexistent document will throw a `Missing404Exception`.

Exceptions are a useful and consistent way to deal with problems like missing 
documents, syntax errors, version conflicts, and so on. But sometimes you want 
to deal with the response body rather than catch exceptions (often useful in 
test suites).

If you need that behavior, you can configure an `ignore` parameter. You can 
configure it in the `client` parameter of the request array. For instance, the 
example below ignores the `Missing404Exception` exception and returns 
the JSON provided by {es} instead.


[source,php]
----
$client = ClientBuilder::create()->build();

$params = [
    'index'  => 'test_missing',
    'id'     => 1,
    'client' => [ 'ignore' => 404 ] <1>
];
echo $client->get($params);

> {"_index":"test_missing","_type":"_doc","_id":"1","found":false}
----
<1> This ignores the 404 missing exception.

You can specify multiple HTTP status codes to ignore by providing an array of 
values:

[source,php]
----
$client = ClientBuilder::create()->build();

$params = [
    'index'  => 'test_missing',
    'client' => [ 'ignore' => [400, 404] ] <1>
];
echo $client->get($params);

> No handler found for uri [/test_missing/test/] and method [GET]

----
<1> `ignore` also accepts an array of exceptions to ignore. In this example, the 
`BadRequest400Exception` is being ignored.

It should be noted that the response is a string which may or may not be encoded 
as JSON. In the first example, the response body is a complete JSON object which 
could be decoded. In the second example, it was simply a string.

Since the client has no way of knowing what the exception response will contain, 
no attempts to decode it are taken.


==== Providing custom query parameters

Sometimes you need to provide custom query parameters, such as authentication 
tokens for a third-party plugin or proxy. All query parameters are allow listed 
in Elasticsearch-php, which is to protect you from specifying a parameter which 
is not accepted by {es}.

If you need custom parameters, you need to bypass this allow listing mechanism. 
To do so, add them to the `custom` parameter as an array of values:

[source,php]
----
$client = ClientBuilder::create()->build();

$params = [
    'index'  => 'test',
    'id'     => 1,
    'parent' => 'abc',              // allowlisted Elasticsearch parameter
    'client' => [
        'custom' => [
            'customToken' => 'abc', // user-defined, not allow listed, not checked
            'otherToken'  => 123
        ]
    ]
];
$exists = $client->exists($params);
----


==== Increasing the verbosity of responses

By default, the client only returns the response body. If you require more 
information (for example, stats about the transfer, headers, status codes, and 
so on), you can tell the client to return a more verbose response. This is 
enabled via the `verbose` parameter in the client options.

Without verbosity, all you see is the response body:

[source,php]
----
$client = ClientBuilder::create()->build();

$params = [
    'index' => 'test',
    'id'    => 1
];
$response = $client->get($params);
print_r($response);


Array
(
    [_index] => test
    [_type] => _doc
    [_id] => 1
    [_version] => 1
    [found] => 1
    [_source] => Array
        (
            [field] => value
        )

)
----

With verbosity turned on, you will see all of the transfer stats:

[source,php]
----
$client = ClientBuilder::create()->build();

$params = [
    'index'  => 'test',
    'id'     => 1,
    'client' => [
        'verbose' => true
    ]
];
$response = $client->get($params);
print_r($response);


Array
(
    [transfer_stats] => Array
        (
            [url] => http://127.0.0.1:9200/test/test/1
            [content_type] => application/json; charset=UTF-8
            [http_code] => 200
            [header_size] => 86
            [request_size] => 51
            [filetime] => -1
            [ssl_verify_result] => 0
            [redirect_count] => 0
            [total_time] => 0.00289
            [namelookup_time] => 9.7E-5
            [connect_time] => 0.000265
            [pretransfer_time] => 0.000322
            [size_upload] => 0
            [size_download] => 96
            [speed_download] => 33217
            [speed_upload] => 0
            [download_content_length] => 96
            [upload_content_length] => -1
            [starttransfer_time] => 0.002796
            [redirect_time] => 0
            [redirect_url] =>
            [primary_ip] => 127.0.0.1
            [certinfo] => Array
                (
                )

            [primary_port] => 9200
            [local_ip] => 127.0.0.1
            [local_port] => 62971
        )

    [curl] => Array
        (
            [error] =>
            [errno] => 0
        )

    [effective_url] => http://127.0.0.1:9200/test/test/1
    [headers] => Array
        (
            [Content-Type] => Array
                (
                    [0] => application/json; charset=UTF-8
                )

            [Content-Length] => Array
                (
                    [0] => 96
                )

        )

    [status] => 200
    [reason] => OK
    [body] => Array
        (
            [_index] => test
            [_type] => _doc
            [_id] => 1
            [_version] => 1
            [found] => 1
            [_source] => Array
                (
                    [field] => value
                )
        )
)
----

==== Curl Timeouts

It is possible to configure per-request curl timeouts via the `timeout` and 
`connect_timeout` parameters. These control the client-side, curl timeouts. The 
`connect_timeout` parameter controls how long curl should wait for the "connect" 
phase to finish, while the `timeout` parameter controls how long curl should 
wait for the entire request to finish.

If either timeout expires, curl closes the connection and returns an error. Both 
parameters should be specified in seconds.

Note: client-side timeouts *do not* mean that {es} aborts the request. {es} will 
continue executing the request until it completes. In the case of a slow query 
or bulk request, the operation continues executing "in the background", unknown 
to your client. If your client kills connections rapidly with a timeout, only to 
immediately execute another request, it is possible to swamp the server with 
many connections because there is no "back-pressure" on the client. In these 
situations, you will see the appropriate threadpool queue growing in size, and 
may start receiving `EsRejectedExecutionException` exceptions from {es} when the 
queue finally reaches capacity.


[source,php]
----
$client = ClientBuilder::create()->build();

$params = [
    'index'  => 'test',
    'id'     => 1,
    'client' => [
        'timeout' => 10,        // ten second timeout
        'connect_timeout' => 10
    ]
];
$response = $client->get($params);
----


==== Enabling Future Mode

The client supports asynchronous, batch processing of requests. This is enabled 
(if your HTTP handler supports it) on a per-request basis via the `future` 
parameter in the client options:

[source,php]
----
$client = ClientBuilder::create()->build();

$params = [
    'index'  => 'test',
    'id'     => 1,
    'client' => [
        'future' => 'lazy'
    ]
];
$future = $client->get($params);
$results = $future->wait();       // resolve the future
----

Future mode supports two options: `true` or `'lazy'`. For more details about how 
asynchronous execution functions, and how to work with the results, see the 
dedicated page on <<future_mode>>.


==== SSL Encryption

Normally, you specify SSL configurations when you create the client (see 
<<authentication>> for more details), since encryption typically applies to all 
requests. However, it is possible to configure on a per-request basis, too, if 
you need that functionality. For example, if you need to use a self-signed cert 
on a specific request, you can specify it via the `verify` parameter in the 
client options:

[source,php]
----
$client = ClientBuilder::create()->build();

$params = [
    'index'  => 'test',
    'id'     => 1,
    'client' => [
        'verify' => 'path/to/cacert.pem'      //Use a self-signed certificate
    ]
];
$result = $client->get($params);
----
